Temperature Correction Schemes Stefan Dreizler Institut für Astronomie und Astrophysik, Sand 1,D-72076 Tübingen The pro and contra for using temperature correction are discussed on the basis of our linearization scheme and our implementation of an Unsöld-Lucy temperature correction. I will show the improvements which partly overcome the typical weakness of the UL-scheme as well as our generalization to non-LTE.